2024 04/29 00:00:00UT - 2024 05/05 24:00:00UT

H(nT)

-1250.0

750.0

D(nT)

-1000.0

1000.0

Z(nT)

CNA(V)

0.00

10.00 dH(V)

-10.00 dD(V) dZ(V)

V350(V)

-0.50

2.00

V750(V)

3.00

V1.2K(V)

6.00

V2K(V)

V4K(V)

V8K(V)

V30K(V)

-1.00

V60K(V)

V95K(V)